So. Carolina Region 0.2-s SARatio 2%PE/50 years

88˚W

86˚W

84˚W

82˚W

80˚W

78˚W

76˚W

74˚W

72˚W

26˚N

28˚N

30˚N

32˚N

34˚N

36˚N

38˚N

40˚N

GMT Apr 14 17:10 CEUS 5hz SA ratio 2%50 year PE. 2008 over 2002. Dark blue: >20% reduction in 2007

0 500 km

0.80

0.85

0.90

0.92

0.94

0.96

0.98

1.02

1.04

1.06

1.10SARatio