So. Carolina Region 1s SA Ratio 2%PE/50 yr

88˚W

87˚W

86˚W

85˚W

84˚W

83˚W

82˚W

81˚W

80˚W 79˚W

78˚W

77˚W

76˚W

75˚W

74˚W

73˚W

72˚W

25˚N

26˚N

27˚N

28˚N

29˚N

30˚N

31˚N

32˚N

33˚N

34˚N

35˚N

36˚N

37˚N

38˚N

39˚N

40˚N

GMT Apr 14 17:12 Southeast US, 1hz SA ratio for seismic hazard having 2% in 50 year PE. 2008 over 2002.

0 500 km

0.85

0.90

0.92

0.94

0.96

0.98

1.02

1.04

1.06

1.10SARatio