PGA with 2%PE 50 yr. 2008

100˚W

95˚W

90˚W

85˚W

80˚W

75˚W

70˚W

25˚N

30˚N

35˚N

40˚N

45˚N

0 500 km

0.70

0.80

0.90

0.92

0.94

0.95

0.96

0.98

0.99

1.00

1.01

1.02

1.04

1.06

1.07

1.09

1.15PGARatio