CEUS 1s SA_Ratio 10%/50yr. 2008 /2002

100˚W

95˚W

90˚W

85˚W

80˚W

75˚W

70˚W

65˚W

25˚N

30˚N

35˚N

40˚N

45˚N

GMT Apr 11 16:10 CEUS SA 10% 50yr PE 1sec ratio 2008 models numerator, 2002 model denominator. BC rock site condition

0 500 km

0.75

0.80

0.85

0.90

0.94

0.98

1.02

1.06

1.10

1.20SAratio