100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

70˚W

70˚W

30˚N

30˚N

40˚N

40˚N

50˚N

50˚N

2

2

4

4

4

6

6

6

6

8

8

8

8

8

10

10

10

10

10

20

20

60

80

024681012141618203040506080120160200300

1.0 sec SA (%g) with 2% Probability of Exceedance in 50 Years USGS Map, Oct. 2002