256˚

258˚

258˚

260˚

260˚

262˚

262˚

264˚264˚

266˚

266˚

268˚

268˚

270˚

270˚

272˚

30˚

30˚

32˚

32˚

34˚

34˚

36˚

36˚

38˚

38˚

40˚

40˚

42˚

42˚

0 500 km GMT Jul 20 08:12 Tulsa OK 1.0 sec SA (0.0697 g), radius=750 km Lambert rectangular (from SOUTH) hmax8.3e-5. Plotted NMSZ hazard to scale

5.05.55.86.16.46.77.28.0M

Tulsa Oklahoma. Disaggregated Seismic Hazard for 1.0 second Spectral Acceleration (NMSZ M8 to scale)

PE = 2% per 50 yr. Polar Display, radius 750 km, DeltaR=10 km Mw: Binned average (weighed by exceedance contributions)