-118˚-118˚

-116˚ -116˚

32˚

32˚

34˚

34˚

0 50 100 km

GMT Sep 2 11:06 San Diego CA 1.0-s PSA (0.6184 g), radius=250 km Site coords 32.697 -117.133 hmax=3.48*10**-4 Yellow circles: cities. Red diamonds: historical earthquakes, M>6

5.66.06.46.66.87.27.68.0M

San Diego CA Disaggregated Seismic Hazard for 1.0 second Spectral Acceleration, 0.618 g

PE = 2% in 50 years. Hazard radius 250 km, DeltaR=10 km Mw: Binned average is color-coded. Bins are equal-area. Predominant hazard from Rose Canyon fault system Note hazard from Coronado fault, 20 km west of San Diego

Pacific Ocean

California

Mexico