-126˚

-124˚-124˚

-122˚

-122˚

-120˚ -120˚

44˚

44˚

46˚

46˚

0 50 100 km

GMT Aug 3 15:30 Portland Oregon 1.0 sec SA (0.3315 g), radius=250 km. Site coords 45.5236N 122.675W. hmax=1.07*10**-4. Yellow circles: cities. Red diamonds: historical eqs M>6

5.56.06.26.46.66.87.27.68.09.0M

Portland OR Disaggregated Seismic Hazard for 1-second Spectral Acceleration, 0.332 g

PE = 2% in 50 years. Hazard radius 250 km, DeltaR=10 km Mw: Binned average (weighed by exceedance contributions) M8.3, red. M9, pink. Minor plot revisions Aug 3, 1999.

Washington

Oregon

Pacific Ocean