-126˚-126˚

-124˚-124˚

-122˚ -122˚

-120˚

-120˚

46˚

46˚

48˚

48˚

0 50 100 km

GMT Aug 4 08:42 Olympia WA 1.0 sec SA (0.384 g), radius=250 km Site coords 47.038 -122.8994 hmax=1.12*10**-4. Yellow circles: cities. Red lines: faults. Red diamonds: historical earthquakes, M>6

5.56.06.26.46.66.87.27.68.09.0M

Olympia WA Disaggregated Seismic Hazard for 1-second Spectral Acceleration, 0.384 g

PE = 2% in 50 years. Hazard radius 250 km, DeltaR 10 km Average Mw is color-coded.

Principal hazard: M8.3 (red) or M9 (pink) Cascadia subduction Deep seismicity hazard plotted at epicentral location

Canada

Washington

Oregon

Columbia R.

Pacific Ocean