238˚ 238˚

38˚

38˚

0 50 100 km

GMT Nov 2 08:55 Menlo Park CA 0.2 sec SA (2.105 g). Site coords 37.454 -122.183 hmax=2.8*10**-4 Yellow circles: cities. Red diamonds: Historical earthquakes, M>6. View angle 35 deg from horizon.

5.76.26.46.66.87.27.68.0M

Menlo Park CA Disaggregated Seismic Hazard for 0.2 second Spectral Acceleration, 2.105 g

PE = 2% per 50 yr. Hazard radius 150 km, DeltaR=10 km Mw: Binned average. Equal-area bins, 157.1 km^2 70% of hazard from San Andreas, 1906 segment 18% of hazard from San Andreas, Peninsular segment

Pacific Ocean

California