264˚

266˚

266˚

268˚

268˚

270˚

270˚

272˚272˚

274˚

274˚

276˚

276˚

278˚

278˚

280˚

280˚

282˚

36˚

36˚

38˚

38˚

40˚

40˚

42˚

42˚

44˚

44˚

46˚

46˚

48˚

48˚

0 500 km GMT Jul 28 15:01 Chicago IL 0.2 sec SA (0.057 g), radius=750 km Fine-dR analysis (from SOUTH) hmax9.7*10^-5. Plotted NMSZ hazard to scale

5.05.55.86.16.46.77.28.0M

Chicago IL Disaggregated Seismic Hazard for 0.2 second Spectral Acceleration, .058 g

PE = 10% per 50 yr. Hazard radius 750 km, DeltaR=10 km Mw: Binned average (weighed by exceedance contributions)