-126˚

-126˚

-124˚-124˚

-122˚ -122˚

46˚

46˚

48˚

48˚

0 50 100 km

GMT Aug 4 11:16 Aberdeen WA 1.0-s PSA (0.717 g), radius=250 km. Site coords 46.97555 -123.8145 hmax=2.86*10**-4. Red lines: Qt faults. Red diamonds: historical eqs, M>6. Yellow circles: cities.

5.56.06.26.46.66.87.27.68.09.0M

Aberdeen WA Disaggregated Seismic Hazard for 1 second Spectral Acceleration, 0.717 g

PE = 2% in 50 years. Hazard radius 250 km, DeltaR=10 km Mw: average Mw is color-coded Principal hazard: M8.3 Cascadia Subduction (red) Closest M8.3 hazard plotted 20 km away from Aberdeen corresponds to 20 km deep subduction earthquake near site.

Washington

Canada

Oregon

Pacific Ocean